Summary Page Created:Thu September 21, 2006 05:25 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 490017

Instrument: ACIS Obs ID: 3662 Source: HER X-1 PI: Dr. CXC Calibration Title: MEASURING THE WINGS OF THE HRMA PSF WITH HER X-1

acisf03662N002 full img2.fits acisf03662N002 cntr img2.fits

Summary Page Created:Thu September 21, 2006 05:25 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 490017

Instrument: ACIS Obs ID: 3662 Source: HER X-1 PI: Dr. CXC Calibration Title: MEASURING THE WINGS OF THE HRMA PSF WITH HER X-1

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T08:45:21 Date and time of file creation DATE-OBS 2002-07-01T23:37:38 Observation start date DATE-END 2002-07-02T14:03:05 Observation end date RA PNT 254.47042152946 Pointing RA DEC PNT 35.349687439354 Pointing Dec ROLL PNT 207.24753234852 Pointing Roll RA TARG 254.457583 Observer’s specified target RA DEC TARG 35.342433 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T09:23:29 Date and time of file creation DATE-OBS 2002-07-01T23:37:38 Observation start date DATE-END 2002-07-02T14:03:05 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-2367 Detector GRATING NONE Grating OBJECT HER X-1 Source name TITLE MEASURING THE WINGS OF THE HRMA PSF WITH HER X-1

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3662 Observation id SEQ NUM 490017 Sequence number RA NOM 254.47042152946 Nominal RA DEC NOM 35.349687439354 Nominal Dec ROLL NOM 207.24753234852 Nominal Roll

Summary Page Created:Thu September 21, 2006 05:25 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 490017

Instrument: ACIS Obs ID: 3662 Source: HER X-1 PI: Dr. CXC Calibration Title: MEASURING THE WINGS OF THE HRMA PSF WITH HER X-1

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 254.521873 35.240409 2694.344727 78.520515 34.313896 254.456334 35.342833 5087.714355 148.956558 34.155693 254.520530 35.242544 2675.289551 81.945648 32.647125 254.513491 35.253742 2087.693115 69.759071 29.927195 254.517498 35.247374 2317.097412 77.896744 29.745754 254.511419 35.257032 2053.375000 69.456467 29.563482 254.519321 35.244491 2295.969971 77.926079 29.463436 254.457745 35.343411 4355.571289 148.960892 29.239698 254.515696 35.250252 2269.687500 77.647972 29.230480 254.514485 35.252166 2225.972412 78.061852 28.515497