Summary Page Created:Tue September 19, 2006 15:21 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590239

Instrument: ACIS Obs ID: 2850 Source: E0102-72.3 [Chip S3, T=120, Offsets=1,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf02850N002 full img2.fits acisf02850N002 cntr img2.fits

Summary Page Created:Tue September 19, 2006 15:21 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590239

Instrument: ACIS Obs ID: 2850 Source: E0102-72.3 [Chip S3, T=120, Offsets=1,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T18:50:51 Date and time of file creation DATE-OBS 2002-06-19T16:23:11 Observation start date DATE-END 2002-06-19T18:56:32 Observation end date RA PNT 16.031676918881 Pointing RA DEC PNT -72.042862736828 Pointing Dec ROLL PNT 114.35039693056 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T19:20:24 Date and time of file creation DATE-OBS 2002-06-19T16:23:11 Observation start date DATE-END 2002-06-19T18:56:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip S3, T=120, Offsets=1,0,0]

Source name

TITLE AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2850 Observation id SEQ NUM 590239 Sequence number RA NOM 16.031676918881 Nominal RA DEC NOM -72.042862736828 Nominal Dec ROLL NOM 114.35039693056 Nominal Roll

Summary Page Created:Tue September 19, 2006 15:21 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590239

Instrument: ACIS Obs ID: 2850 Source: E0102-72.3 [Chip S3, T=120, Offsets=1,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.017515 -72.033836 497.714294 48.392624 10.284921 16.480096 -72.064204 115.397728 12.389888 9.313864 16.019181 -72.032752 444.142853 50.269840 8.835176 15.999765 -72.028391 373.428558 44.760918 8.342737 16.008632 -72.031974 260.285706 32.888603 7.914161 16.020113 -72.031665 346.571442 44.070965 7.863940 16.002487 -72.034845 351.142853 46.415646 7.565183 16.015744 -72.034673 332.571442 47.860317 6.948793 16.013103 -72.035202 302.000000 43.615948 6.924073 15.800700 -71.741798 208.701004 31.805403 6.561810