Summary Page Created:Tue September 19, 2006 15:39 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590240

Instrument: ACIS Obs ID: 2851 Source: E0102-72.3 [Chip S3, T=120, Offsets=-1,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf02851N002 full img2.fits acisf02851N002 cntr img2.fits

Summary Page Created:Tue September 19, 2006 15:39 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590240

Instrument: ACIS Obs ID: 2851 Source: E0102-72.3 [Chip S3, T=120, Offsets=-1,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T19:03:36 Date and time of file creation DATE-OBS 2002-06-19T18:56:32 Observation start date DATE-END 2002-06-19T21:17:56 Observation end date RA PNT 15.987482235403 Pointing RA DEC PNT -72.012425627617 Pointing Dec ROLL PNT 114.21181973722 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T19:38:01 Date and time of file creation DATE-OBS 2002-06-19T18:56:32 Observation start date DATE-END 2002-06-19T21:17:56 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip S3, T=120, Offsets=-1,0,0]

Source name

TITLE AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2851 Observation id SEQ NUM 590240 Sequence number RA NOM 15.987482235403 Nominal RA DEC NOM -72.012425627617 Nominal Dec ROLL NOM 114.21181973722 Nominal Roll

Summary Page Created:Tue September 19, 2006 15:39 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590240

Instrument: ACIS Obs ID: 2851 Source: E0102-72.3 [Chip S3, T=120, Offsets=-1,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.015715 -72.034799 431.714294 46.324631 9.319324 16.017663 -72.033748 435.571442 47.407368 9.187842 16.018729 -72.032652 400.428558 46.699116 8.574650 16.003491 -72.034793 384.857147 50.116783 7.679207 16.480277 -72.064324 86.385002 11.395221 7.580810 16.020180 -72.031578 294.285706 42.494080 6.925334 15.999893 -72.028506 305.714294 44.422569 6.881958 16.008669 -72.032089 207.000000 32.417507 6.385438 15.906519 -72.025893 58.428570 9.494619 6.153862 16.013113 -72.035333 253.000000 41.512505 6.094549