Summary Page Created:Wed September 20, 2006 19:35 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590242

Instrument: ACIS Obs ID: 2853 Source: E0102-72.3 [Chip S0, T=120, Offsets=21,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf02853N002 full img2.fits acisf02853N002 cntr img2.fits

Summary Page Created:Wed September 20, 2006 19:35 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590242

Instrument: ACIS Obs ID: 2853 Source: E0102-72.3 [Chip S0, T=120, Offsets=21,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-20T22:48:29 Date and time of file creation DATE-OBS 2002-06-22T06:17:56 Observation start date DATE-END 2002-06-22T08:50:07 Observation end date RA PNT 16.444639545692 Pointing RA DEC PNT -72.359298496527 Pointing Dec ROLL PNT 112.19085762045 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-20T23:34:09 Date and time of file creation DATE-OBS 2002-06-22T06:17:56 Observation start date DATE-END 2002-06-22T08:50:07 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip S0, T=120, Offsets=21,0,0]

Source name

TITLE AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2853 Observation id SEQ NUM 590242 Sequence number RA NOM 16.444639545692 Nominal RA DEC NOM -72.359298496527 Nominal Dec ROLL NOM 112.19085762045 Nominal Roll

Summary Page Created:Wed September 20, 2006 19:35 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590242

Instrument: ACIS Obs ID: 2853 Source: E0102-72.3 [Chip S0, T=120, Offsets=21,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.737622 -72.413441 149.847504 15.495261 9.670537 16.251121 -72.058166 233.408630 33.280830 7.013306 16.515352 -72.388036 56.428570 9.375030 6.019028 15.983329 -72.187346 90.971413 18.064116 5.036029 15.898371 -72.111538 138.549103 29.703646 4.664381 16.488667 -72.350189 34.000000 7.300402 4.657278 16.356205 -72.324748 31.000000 6.853433 4.523280 15.892248 -72.097244 127.534882 29.502325 4.322875 16.125872 -72.070565 147.906982 34.452427 4.293078 16.361392 -72.125673 85.000000 19.918297 4.267433