Summary Page Created:Wed September 20, 2006 20:20 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590243

Instrument: ACIS Obs ID: 2854 Source: E0102-72.3 [Chip S2, T=120, Offsets=5,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf02854N002 full img2.fits acisf02854N002 cntr img2.fits

Summary Page Created:Wed September 20, 2006 20:20 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590243

Instrument: ACIS Obs ID: 2854 Source: E0102-72.3 [Chip S2, T=120, Offsets=5,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T00:03:58 Date and time of file creation DATE-OBS 2002-06-22T08:50:07 Observation start date DATE-END 2002-06-22T11:10:17 Observation end date RA PNT 16.113147626856 Pointing RA DEC PNT -72.107430983142 Pointing Dec ROLL PNT 111.85386235743 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T00:18:51 Date and time of file creation DATE-OBS 2002-06-22T08:50:07 Observation start date DATE-END 2002-06-22T11:10:17 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip S2, T=120, Offsets=5,0,0]

Source name

TITLE AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2854 Observation id SEQ NUM 590243 Sequence number RA NOM 16.113147626856 Nominal RA DEC NOM -72.107430983142 Nominal Dec ROLL NOM 111.85386235743 Nominal Roll

Summary Page Created:Wed September 20, 2006 20:20 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590243

Instrument: ACIS Obs ID: 2854 Source: E0102-72.3 [Chip S2, T=120, Offsets=5,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.999235 -72.028674 1116.363647 62.570244 17.841766 16.019447 -72.032911 815.208313 57.133793 14.268409 16.009318 -72.027125 781.352295 58.813618 13.285227 16.004201 -72.034841 713.958313 58.615028 12.180466 15.997656 -72.031460 684.875000 58.398144 11.727685 16.019934 -72.029438 422.791656 50.687569 8.341131 16.008347 -72.032181 351.208344 42.290363 8.304689 16.272292 -72.388071 263.742859 32.046307 8.230055 16.273817 -72.381197 248.416672 32.963833 7.536037 15.923639 -71.805882 157.428574 33.462807 4.704584