Summary Page Created:Wed September 20, 2006 20:33 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590244

Instrument: ACIS Obs ID: 2855 Source: E0102-72.3 [Chip S4, T=120, Offsets=-9,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf02855N003 full img2.fits acisf02855N003 cntr img2.fits

Summary Page Created:Wed September 20, 2006 20:33 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590244

Instrument: ACIS Obs ID: 2855 Source: E0102-72.3 [Chip S4, T=120, Offsets=-9,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T00:06:47 Date and time of file creation DATE-OBS 2002-06-22T11:10:17 Observation start date DATE-END 2002-06-22T13:31:54 Observation end date RA PNT 15.829944585321 Pointing RA DEC PNT -71.885712498501 Pointing Dec ROLL PNT 111.56634591859 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T00:31:43 Date and time of file creation DATE-OBS 2002-06-22T11:10:17 Observation start date DATE-END 2002-06-22T13:31:54 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72.3 [Chip S4, T=120, Offsets=-9,0,0]

Source name

TITLE AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2855 Observation id SEQ NUM 590244 Sequence number RA NOM 15.829944585321 Nominal RA DEC NOM -71.885712498501 Nominal Dec ROLL NOM 111.56634591859 Nominal Roll

Summary Page Created:Wed September 20, 2006 20:33 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590244

Instrument: ACIS Obs ID: 2855 Source: E0102-72.3 [Chip S4, T=120, Offsets=-9,0,0] PI: Dr. CXC Calibration Title: AO3B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.998773 -72.032811 2680.314941 107.731445 24.879597 16.003931 -72.027842 2107.067383 97.314575 21.652126 16.018127 -72.033567 1915.503418 96.004181 19.952291 15.292951 -71.623330 165.043182 27.759155 5.945540 15.332908 -71.617495 145.146179 29.495743 4.920919 15.766558 -71.660363 96.137253 19.933220 4.822967 15.690404 -71.603749 122.583931 26.875120 4.561242 15.660580 -71.584461 136.853821 30.526588 4.483102 15.603481 -71.585055 142.033218 32.474026 4.373748 16.347433 -72.120999 55.583332 12.786370 4.347077