Summary Page Created:Wed November 21, 2007 16:38 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590256

Instrument: HRC Obs ID: 2867 Source: G21.5-0.9 [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3A CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

hrcf02867N003 full img2.fits hrcf02867N003 cntr img2.fits

Summary Page Created:Wed November 21, 2007 16:38 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590256

Instrument: HRC Obs ID: 2867 Source: G21.5-0.9 [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3A CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T21:05:46 Date and time of file creation DATE-OBS 2002-03-12T22:19:28 Observation start date DATE-END 2002-03-13T03:48:38 Observation end date RA PNT 278.3913143988 Pointing RA DEC PNT -10.564659580493 Pointing Dec ROLL PNT 89.626034927377 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T21:37:15 Date and time of file creation DATE-OBS 2002-03-12T22:19:28 Observation start date DATE-END 2002-03-13T03:48:38 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT G21.5-0.9 [HRC-I, Offsets=0,0,0] Source name TITLE AO3A CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2867 Observation id SEQ NUM 590256 Sequence number RA NOM 278.3913143988 Nominal RA DEC NOM -10.564659580493 Nominal Dec ROLL NOM 89.626034927377 Nominal Roll

Summary Page Created:Wed November 21, 2007 16:38 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590256

Instrument: HRC Obs ID: 2867 Source: G21.5-0.9 [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3A CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389960 -10.568702 179.708328 28.011856 6.415438 278.697897 -10.621250 197.998215 37.556652 5.271988 278.316701 -10.296116 150.166428 30.923691 4.856032 278.365749 -10.590063 40.142857 8.566412 4.686076 278.352115 -10.262421 172.832138 37.046696 4.665251 278.491280 -10.312690 132.969238 29.147921 4.561877 278.520078 -10.789205 137.482758 30.586323 4.494910 278.316578 -10.295961 134.863632 30.029417 4.491051 278.436464 -10.873126 167.077682 38.159321 4.378424 278.670606 -10.651174 144.958328 33.319565 4.350547