Summary Page Created:Wed November 21, 2007 15:25 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590260

Instrument: HRC Obs ID: 2871 Source: CAS A [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3A CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

hrcf02871N003 full img2.fits hrcf02871N003 cntr img2.fits

Summary Page Created:Wed November 21, 2007 15:25 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590260

Instrument: HRC Obs ID: 2871 Source: CAS A [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3A CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T20:08:21 Date and time of file creation DATE-OBS 2002-02-06T04:42:44 Observation start date DATE-END 2002-02-06T06:23:17 Observation end date RA PNT 350.86194504858 Pointing RA DEC PNT 58.811448699312 Pointing Dec ROLL PNT 329.33806373425 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T20:23:51 Date and time of file creation DATE-OBS 2002-02-06T04:42:44 Observation start date DATE-END 2002-02-06T06:23:17 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT CAS A [HRC-I, Offsets=0,0,0] Source name TITLE AO3A CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2871 Observation id SEQ NUM 590260 Sequence number RA NOM 350.86194504858 Nominal RA DEC NOM 58.811448699312 Nominal Dec ROLL NOM 329.33806373425 Nominal Roll

Summary Page Created:Wed November 21, 2007 15:25 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590260

Instrument: HRC Obs ID: 2871 Source: CAS A [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3A CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.848769 58.839991 372.204559 32.616074 11.411691 350.866320 58.811788 125.500000 13.637341 9.202673 350.853415 58.840611 235.170456 27.084185 8.682944 350.857681 58.834294 190.977280 22.222017 8.594057 350.886283 58.796838 182.791672 25.987658 7.033788 350.830879 58.843057 189.857147 30.606850 6.203093 350.881328 58.796447 143.041672 23.782637 6.014542 350.836899 58.841300 128.954544 22.860277 5.640988 350.913190 58.803509 142.363632 25.772068 5.523951 350.921795 58.812295 123.590912 23.064545 5.358480