Summary Page Created:Mon October 2, 2006 14:47 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590265

Instrument: ACIS Obs ID: 2876 Source: CAS A [Chip I3, T=120, Offsets=-2,2,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

acisf02876N002 full img2.fits acisf02876N002 cntr img2.fits

Summary Page Created:Mon October 2, 2006 14:47 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590265

Instrument: ACIS Obs ID: 2876 Source: CAS A [Chip I3, T=120, Offsets=-2,2,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-02T18:21:35 Date and time of file creation DATE-OBS 2002-08-31T11:38:56 Observation start date DATE-END 2002-08-31T12:49:04 Observation end date RA PNT 350.77908843029 Pointing RA DEC PNT 58.88493545269 Pointing Dec ROLL PNT 168.19010826864 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 155.54277039 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-02T18:46:04 Date and time of file creation DATE-OBS 2002-08-31T11:38:56 Observation start date DATE-END 2002-08-31T12:49:04 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT CAS A [Chip I3, T=120, Offsets=- 2,2,0]

Source name

TITLE AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2876 Observation id SEQ NUM 590265 Sequence number RA NOM 350.77908843029 Nominal RA DEC NOM 58.88493545269 Nominal Dec ROLL NOM 168.19010826864 Nominal Roll

Summary Page Created:Mon October 2, 2006 14:47 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590265

Instrument: ACIS Obs ID: 2876 Source: CAS A [Chip I3, T=120, Offsets=-2,2,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.887840 58.796260 905.445007 57.058960 15.868586 350.821948 58.793034 403.988647 34.079472 11.854310 350.905693 58.817626 383.227264 33.844086 11.323316 350.858236 58.801203 413.863647 36.795639 11.247627 350.880874 58.796307 408.227264 36.515514 11.179558 350.848758 58.840211 395.397736 35.746323 11.061214 350.927875 58.816797 554.795471 50.755623 10.930719 350.893352 58.794012 595.729980 55.211906 10.789883 350.853384 58.840384 287.772736 30.703730 9.372566 350.923083 58.811410 469.244995 54.770321 8.567505