Summary Page Created:Wed November 21, 2007 18:52 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590267

Instrument: HRC Obs ID: 2878 Source: CAS A [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

hrcf02878N003 full img2.fits hrcf02878N003 cntr img2.fits

Summary Page Created:Wed November 21, 2007 18:52 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590267

Instrument: HRC Obs ID: 2878 Source: CAS A [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T23:34:32 Date and time of file creation DATE-OBS 2002-08-30T17:03:40 Observation start date DATE-END 2002-08-30T18:39:19 Observation end date RA PNT 350.85077865407 Pointing RA DEC PNT 58.817362605089 Pointing Dec ROLL PNT 167.0912779754 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T23:50:54 Date and time of file creation DATE-OBS 2002-08-30T17:03:40 Observation start date DATE-END 2002-08-30T18:39:19 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT CAS A [HRC-I, Offsets=0,0,0] Source name TITLE AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 2878 Observation id SEQ NUM 590267 Sequence number RA NOM 350.85077865407 Nominal RA DEC NOM 58.817362605089 Nominal Dec ROLL NOM 167.0912779754 Nominal Roll

Summary Page Created:Wed November 21, 2007 18:52 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590267

Instrument: HRC Obs ID: 2878 Source: CAS A [HRC-I, Offsets=0,0,0] PI: Dr. CXC Calibration Title: AO3B CALIBRATION OBSERVATIONS THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.853012 58.840615 87.534088 15.103961 5.795439 350.768694 58.495183 248.428574 43.745564 5.678944 350.848380 58.839979 102.784088 19.280495 5.330988 350.974353 59.140122 228.262451 42.863945 5.325279 350.881306 58.796309 72.613640 14.624532 4.965194 351.346753 58.687626 171.208328 38.684555 4.425754 350.901568 59.119694 166.773209 37.867081 4.404174 351.472254 58.773007 193.225906 44.541096 4.338149 351.253983 58.649182 124.851746 29.224941 4.272096 350.857517 58.834228 50.833332 11.984953 4.241430