Summary Page Created:Wed November 21, 2007 16:22 EST page: 1 of 3

Chandra X-ray Center Seq Num: 890025

Instrument: HRC Obs ID: 3292 Source: COMA PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF THE COMA CLUSTER

hrcf03292N003 full img2.fits hrcf03292N003 cntr img2.fits

Summary Page Created:Wed November 21, 2007 16:22 EST page: 2 of 3

Chandra X-ray Center Seq Num: 890025

Instrument: HRC Obs ID: 3292 Source: COMA PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF THE COMA CLUSTER

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T21:04:58 Date and time of file creation DATE-OBS 2002-05-02T07:20:14 Observation start date DATE-END 2002-05-02T10:29:01 Observation end date RA PNT 194.94513314055 Pointing RA DEC PNT 27.96595924444 Pointing Dec ROLL PNT 211.50402894199 Pointing Roll RA TARG 194.95 Observer’s specified target RA DEC TARG 27.966667 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T21:21:03 Date and time of file creation DATE-OBS 2002-05-02T07:20:14 Observation start date DATE-END 2002-05-02T10:29:01 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT COMA Source name TITLE AO3 CALIBRA- TION OBSERVATIONS OF THE COMA CLUSTER

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3292 Observation id SEQ NUM 890025 Sequence number RA NOM 194.94513314055 Nominal RA DEC NOM 27.96595924444 Nominal Dec ROLL NOM 211.50402894199 Nominal Roll

Summary Page Created:Wed November 21, 2007 16:22 EST page: 3 of 3

Chandra X-ray Center Seq Num: 890025

Instrument: HRC Obs ID: 3292 Source: COMA PI: Dr. CXC Calibration Title: AO3 CALIBRATION OBSERVATIONS OF THE COMA CLUSTER

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 194.819691 27.896020 173.208328 19.194687 9.023765 194.620688 27.810927 141.172760 31.433010 4.491226 195.243036 27.981033 97.240105 22.071449 4.405696 195.270771 28.099126 133.707642 31.045265 4.306861 194.659220 27.961062 101.406898 23.912567 4.240736 194.640786 27.891789 106.306816 26.369204 4.031476 195.194234 27.796534 92.625000 23.129435 4.004637 194.890548 28.238866 95.103493 23.924707 3.975116 195.076117 27.690280 108.358925 27.639734 3.920404 195.262014 28.048205 90.041664 23.748514 3.791465