Summary Page Created:Wed February 4, 2009 19:38 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290275

Instrument: HRC Obs ID: 4315 Source: ARLAC PI: Dr. CXC Calibration Title: AO4B CALIBRATION OBSERVATIONS TO MONITOR SPATIAL VARIATIONS IN THE HRC-S GAIN

hrcf04315N005 full img2.fits hrcf04315N005 cntr img2.fits

Summary Page Created:Wed February 4, 2009 19:38 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290275

Instrument: HRC Obs ID: 4315 Source: ARLAC PI: Dr. CXC Calibration Title: AO4B CALIBRATION OBSERVATIONS TO MONITOR SPATIAL VARIATIONS IN THE HRC-S GAIN

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.10 Processing system revision DATE 2009-02-05T00:14:06 Date and time of file creation DATE-OBS 2003-09-01T11:46:53 Observation start date DATE-END 2003-09-01T12:02:18 Observation end date RA PNT 332.16371681717 Pointing RA DEC PNT 45.740864615493 Pointing Dec ROLL PNT 189.79620803009 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.10 Processing system revision DATE 2009-02-05T00:36:43 Date and time of file creation DATE-OBS 2003-09-01T11:46:53 Observation start date DATE-END 2003-09-01T12:02:18 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ARLAC Source name TITLE AO4B CALIBRATION OBSERVATIONS TO MONITOR SPATIAL VARIA- TIONS IN THE HRC-S GAIN

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 4315 Observation id SEQ NUM 290275 Sequence number RA NOM 332.163717 Nominal RA DEC NOM 45.740865 Nominal Dec ROLL NOM 189.796208 Nominal Roll

Summary Page Created:Wed February 4, 2009 19:38 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290275

Instrument: HRC Obs ID: 4315 Source: ARLAC PI: Dr. CXC Calibration Title: AO4B CALIBRATION OBSERVATIONS TO MONITOR SPATIAL VARIATIONS IN THE HRC-S GAIN

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170051 45.742357 3353.541748 61.472492 54.553532 331.841344 45.649845 43.137257 11.320181 3.810651 332.571060 45.835736 57.965179 15.367174 3.772013 331.927477 45.746907 23.897499 6.592227 3.625103 332.595863 45.791985 57.491070 16.602684 3.462758 332.597814 45.778900 56.823215 17.321737 3.280457 332.550349 45.832846 45.416668 14.804103 3.067843