Summary Page Created:Tue July 11, 2006 12:13 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590285

Instrument: ACIS Obs ID: 3530 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

acisf03530N003 full img2.fits acisf03530N003 cntr img2.fits

Summary Page Created:Tue July 11, 2006 12:13 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590285

Instrument: ACIS Obs ID: 3530 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T16:02:06 Date and time of file creation DATE-OBS 2003-08-09T06:22:47 Observation start date DATE-END 2003-08-09T08:58:24 Observation end date RA PNT 16.335442914421 Pointing RA DEC PNT -72.003000123225 Pointing Dec ROLL PNT 63.748255351462 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T16:12:55 Date and time of file creation DATE-OBS 2003-08-09T06:22:47 Observation start date DATE-END 2003-08-09T08:58:24 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,4.5,0] Source name TITLE AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3530 Observation id SEQ NUM 590285 Sequence number RA NOM 16.335442914421 Nominal RA DEC NOM -72.003000123225 Nominal Dec ROLL NOM 63.748255351462 Nominal Roll

Summary Page Created:Tue July 11, 2006 12:13 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590285

Instrument: ACIS Obs ID: 3530 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.018923 -72.033139 1096.840942 57.173130 19.184551 16.000257 -72.028499 974.215027 65.616333 14.847141 16.006592 -72.027515 942.390015 64.084763 14.705368 15.997319 -72.031357 945.242493 65.914841 14.340360 16.003385 -72.034980 903.450012 66.256477 13.635648 16.015505 -72.034864 777.479980 58.927971 13.193734 16.019083 -72.028993 547.784119 49.542126 11.056936 16.010886 -72.027285 492.181824 53.721012 9.161812 16.008910 -72.031525 258.612488 46.319527 5.583229 15.473947 -71.846836 96.205978 19.498938 4.933908