Summary Page Created:Mon July 10, 2006 22:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590286

Instrument: ACIS Obs ID: 3531 Source: E0102-72[I3,-120,-4.0,6.5.0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

acisf03531N002 full img2.fits acisf03531N002 cntr img2.fits

Summary Page Created:Mon July 10, 2006 22:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590286

Instrument: ACIS Obs ID: 3531 Source: E0102-72[I3,-120,-4.0,6.5.0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T02:40:45 Date and time of file creation DATE-OBS 2003-08-10T06:27:56 Observation start date DATE-END 2003-08-10T09:03:29 Observation end date RA PNT 16.432774386102 Pointing RA DEC PNT -72.02030047968 Pointing Dec ROLL PNT 62.780090057428 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 155.220047 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T02:58:24 Date and time of file creation DATE-OBS 2003-08-10T06:27:56 Observation start date DATE-END 2003-08-10T09:03:29 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,6.5.0] Source name TITLE AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3531 Observation id SEQ NUM 590286 Sequence number RA NOM 16.432774386102 Nominal RA DEC NOM -72.02030047968 Nominal Dec ROLL NOM 62.780090057428 Nominal Roll

Summary Page Created:Mon July 10, 2006 22:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590286

Instrument: ACIS Obs ID: 3531 Source: E0102-72[I3,-120,-4.0,6.5.0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.002478 -72.034463 1832.166626 80.259338 22.828081 16.018056 -72.033389 1453.806763 67.559372 21.518950 16.002778 -72.028048 1527.000000 77.692131 19.654499 16.015922 -72.034417 1225.583374 71.960548 17.031322 16.010960 -72.027077 1125.666626 68.609253 16.406921 16.017619 -72.028467 819.261353 60.831150 13.467793 15.402249 -71.967298 113.021942 23.102770 4.892138 16.160951 -72.093551 32.794998 7.569530 4.332501 15.461455 -71.932817 108.578072 26.356607 4.119577 15.906760 -71.938235 36.909092 10.317745 3.577244