Summary Page Created:Mon July 10, 2006 23:24 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590287

Instrument: ACIS Obs ID: 3532 Source: E0102-72[I0,-120,4.7,-5.68,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

acisf03532N002 full img2.fits acisf03532N002 cntr img2.fits

Summary Page Created:Mon July 10, 2006 23:24 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590287

Instrument: ACIS Obs ID: 3532 Source: E0102-72[I0,-120,4.7,-5.68,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T02:59:28 Date and time of file creation DATE-OBS 2003-08-10T09:03:29 Observation start date DATE-END 2003-08-10T11:25:19 Observation end date RA PNT 15.631089869863 Pointing RA DEC PNT -72.053395194203 Pointing Dec ROLL PNT 61.830500233521 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T03:23:27 Date and time of file creation DATE-OBS 2003-08-10T09:03:29 Observation start date DATE-END 2003-08-10T11:25:19 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I0,-120,4.7,-5.68,0] Source name TITLE AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3532 Observation id SEQ NUM 590287 Sequence number RA NOM 15.631089869863 Nominal RA DEC NOM -72.053395194203 Nominal Dec ROLL NOM 61.830500233521 Nominal Roll

Summary Page Created:Mon July 10, 2006 23:24 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590287

Instrument: ACIS Obs ID: 3532 Source: E0102-72[I0,-120,4.7,-5.68,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.000347 -72.034298 1340.572388 69.684402 19.237770 16.017067 -72.034255 1141.137939 62.755360 18.183912 16.020346 -72.032141 1100.943237 65.564171 16.791842 15.999724 -72.028922 1144.696533 68.504051 16.709909 16.010000 -72.027078 867.696533 61.832928 14.032921 15.996828 -72.031196 865.951721 66.959145 12.932539 15.808109 -72.153960 216.089661 16.820419 12.846865 15.406198 -72.071995 186.571426 15.545893 12.001332 15.743888 -72.051139 39.000000 7.688664 5.072402 14.602370 -71.994518 108.044548 22.893770 4.719386