Summary Page Created:Mon July 10, 2006 23:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590288

Instrument: ACIS Obs ID: 3533 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

acisf03533N002 full img2.fits acisf03533N002 cntr img2.fits

Summary Page Created:Mon July 10, 2006 23:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590288

Instrument: ACIS Obs ID: 3533 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T03:22:55 Date and time of file creation DATE-OBS 2003-08-10T11:25:19 Observation start date DATE-END 2003-08-10T13:47:09 Observation end date RA PNT 15.948101318769 Pointing RA DEC PNT -71.94146448132 Pointing Dec ROLL PNT 62.09871473386 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T03:43:07 Date and time of file creation DATE-OBS 2003-08-10T11:25:19 Observation start date DATE-END 2003-08-10T13:47:09 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I1,-120,-4.0,-3.68,0] Source name TITLE AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3533 Observation id SEQ NUM 590288 Sequence number RA NOM 15.948101318769 Nominal RA DEC NOM -71.94146448132 Nominal Dec ROLL NOM 62.09871473386 Nominal Roll

Summary Page Created:Mon July 10, 2006 23:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590288

Instrument: ACIS Obs ID: 3533 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO4B ACIS-I CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.019166 -72.033242 1016.647705 56.210594 18.086409 16.003876 -72.034827 886.965881 59.267502 14.965468 16.001065 -72.028245 643.416687 48.935047 13.148382 15.996914 -72.030983 607.083313 49.801086 12.190163 16.020603 -72.029509 389.583344 44.938904 8.669178 16.009831 -72.026907 411.875000 47.860310 8.605774 16.007829 -72.031714 304.916656 36.494827 8.355065 16.018444 -72.028282 337.500000 45.560558 7.407723 15.906387 -72.025970 43.958332 8.132190 5.405473 15.111266 -71.777750 97.594681 20.026545 4.873267