Summary Page Created:Mon July 10, 2006 22:11 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590300

Instrument: ACIS Obs ID: 3545 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf03545N002 full img2.fits acisf03545N002 cntr img2.fits

Summary Page Created:Mon July 10, 2006 22:11 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590300

Instrument: ACIS Obs ID: 3545 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T01:46:28 Date and time of file creation DATE-OBS 2003-08-08T15:19:09 Observation start date DATE-END 2003-08-08T17:54:37 Observation end date RA PNT 16.044101897362 Pointing RA DEC PNT -72.014213383307 Pointing Dec ROLL PNT 64.076977598005 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T02:10:18 Date and time of file creation DATE-OBS 2003-08-08T15:19:09 Observation start date DATE-END 2003-08-08T17:54:37 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,-1,0,0] Source name TITLE AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3545 Observation id SEQ NUM 590300 Sequence number RA NOM 16.044101897362 Nominal RA DEC NOM -72.014213383307 Nominal Dec ROLL NOM 64.076977598005 Nominal Roll

Summary Page Created:Mon July 10, 2006 22:11 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590300

Instrument: ACIS Obs ID: 3545 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.807318 -72.153807 224.847504 17.896477 12.563786 16.017518 -72.033880 493.428558 49.681705 9.931796 16.015713 -72.034723 475.714294 49.035034 9.701518 16.003352 -72.034729 488.714294 52.719456 9.270094 16.018659 -72.032799 445.142853 48.116173 9.251418 16.008590 -72.032215 274.285706 32.780357 8.367380 15.998961 -72.028407 355.857147 42.916496 8.291850 16.020140 -72.031455 345.142853 41.993580 8.218944 16.003336 -72.028126 326.000000 43.899067 7.426126 15.997061 -72.031422 309.285706 45.815632 6.750659