Summary Page Created:Mon July 10, 2006 22:09 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590301

Instrument: ACIS Obs ID: 3546 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

acisf03546N002 full img2.fits acisf03546N002 cntr img2.fits

Summary Page Created:Mon July 10, 2006 22:09 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590301

Instrument: ACIS Obs ID: 3546 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T01:50:07 Date and time of file creation DATE-OBS 2003-08-08T17:54:37 Observation start date DATE-END 2003-08-08T20:35:57 Observation end date RA PNT 15.698617092357 Pointing RA DEC PNT -72.227346849883 Pointing Dec ROLL PNT 63.513030606186 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T02:08:08 Date and time of file creation DATE-OBS 2003-08-08T17:54:37 Observation start date DATE-END 2003-08-08T20:35:57 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT E0102-72[S1,-120,13.29,0,0] Source name TITLE AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3546 Observation id SEQ NUM 590301 Sequence number RA NOM 15.698617092357 Nominal RA DEC NOM -72.227346849883 Nominal Dec ROLL NOM 63.513030606186 Nominal Roll

Summary Page Created:Mon July 10, 2006 22:09 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590301

Instrument: ACIS Obs ID: 3546 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO4B ACIS-S CALIBRATION OBSERVATIONS OF E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.006980 -72.032967 15731.412109 197.362411 79.708244 16.008500 -72.029609 10724.375977 192.170944 55.806438 15.468351 -72.392484 555.295471 26.753418 20.756056 15.807851 -72.154011 211.000000 19.243559 10.964707 15.687187 -72.256121 90.428574 11.215903 8.062531 15.955863 -71.927622 119.455147 22.175585 5.386787 15.914854 -71.948578 111.833336 23.323063 4.794968 15.890257 -71.966698 94.443184 21.217041 4.451289 16.309041 -71.978445 101.551498 23.741776 4.277334 16.291596 -72.196476 35.875000 8.833766 4.061122