Summary Page Created:Fri August 11, 2006 20:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590304

Instrument: ACIS Obs ID: 3692 Source: G21.5-0.9[Chip I3, T=120, Offsets=-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

acisf03692N002 full img2.fits acisf03692N002 cntr img2.fits

Summary Page Created:Fri August 11, 2006 20:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590304

Instrument: ACIS Obs ID: 3692 Source: G21.5-0.9[Chip I3, T=120, Offsets=-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-11T23:33:58 Date and time of file creation DATE-OBS 2003-05-16T11:51:16 Observation start date DATE-END 2003-05-16T15:03:31 Observation end date RA PNT 278.37925939555 Pointing RA DEC PNT -10.528034884353 Pointing Dec ROLL PNT 106.66352437146 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-12T00:43:20 Date and time of file creation DATE-OBS 2003-05-16T11:51:16 Observation start date DATE-END 2003-05-16T15:03:31 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-3 Detector GRATING NONE Grating OBJECT G21.5-0.9[Chip I3, T=120, Offsets=-2.5,2.5,0]

Source name

TITLE AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3692 Observation id SEQ NUM 590304 Sequence number RA NOM 278.37925939555 Nominal RA DEC NOM -10.528034884353 Nominal Dec ROLL NOM 106.66352437146 Nominal Roll

Summary Page Created:Fri August 11, 2006 20:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590304

Instrument: ACIS Obs ID: 3692 Source: G21.5-0.9[Chip I3, T=120, Offsets=-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389843 -10.568732 704.000000 54.161083 12.998262 278.365747 -10.589974 70.556816 10.417089 6.773180 278.391462 -10.572898 46.142857 14.234115 3.241709 278.386771 -10.575814 19.000000 5.949306 3.193650 278.393694 -10.569867 52.142857 17.355965 3.004319