Summary Page Created:Fri November 23, 2007 14:15 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590306

Instrument: HRC Obs ID: 3694 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

hrcf03694N003 full img2.fits hrcf03694N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 14:15 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590306

Instrument: HRC Obs ID: 3694 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T18:42:32 Date and time of file creation DATE-OBS 2003-05-15T12:43:48 Observation start date DATE-END 2003-05-15T18:28:03 Observation end date RA PNT 278.39003870592 Pointing RA DEC PNT -10.564437268909 Pointing Dec ROLL PNT 105.89562561739 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T19:13:58 Date and time of file creation DATE-OBS 2003-05-15T12:43:48 Observation start date DATE-END 2003-05-15T18:28:03 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT G21.5-0.9 Source name TITLE AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3694 Observation id SEQ NUM 590306 Sequence number RA NOM 278.39003870592 Nominal RA DEC NOM -10.564437268909 Nominal Dec ROLL NOM 105.89562561739 Nominal Roll

Summary Page Created:Fri November 23, 2007 14:15 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590306

Instrument: HRC Obs ID: 3694 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.367434 -10.402462 122.877502 19.643581 6.255351 278.365725 -10.590129 49.714287 8.721066 5.700482 278.092568 -10.588076 183.583328 34.211193 5.366177 278.072714 -10.676622 213.003326 39.805660 5.351081 278.076228 -10.621154 203.877075 38.202988 5.336679 278.527045 -10.834512 199.216064 38.721703 5.144817 278.389827 -10.568822 142.750000 28.240841 5.054736 278.304296 -10.244714 223.799210 44.790276 4.996603 278.332489 -10.255825 200.388702 41.029324 4.884036 278.505258 -10.875524 200.160904 43.755337 4.574548