Summary Page Created:Fri August 11, 2006 16:20 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590307

Instrument: HRC Obs ID: 3695 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

hrcf03695N002 full img2.fits hrcf03695N002 cntr img2.fits

Summary Page Created:Fri August 11, 2006 16:20 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590307

Instrument: HRC Obs ID: 3695 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-11T18:51:59 Date and time of file creation DATE-OBS 2003-05-12T14:32:12 Observation start date DATE-END 2003-05-12T20:18:52 Observation end date RA PNT 278.38850432473 Pointing RA DEC PNT -10.564011910216 Pointing Dec ROLL PNT 104.91977740643 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-11T20:17:46 Date and time of file creation DATE-OBS 2003-05-12T14:32:12 Observation start date DATE-END 2003-05-12T20:18:52 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT G21.5-0.9 Source name TITLE AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3695 Observation id SEQ NUM 590307 Sequence number RA NOM 278.38850432473 Nominal RA DEC NOM -10.564011910216 Nominal Dec ROLL NOM 104.91977740643 Nominal Roll

Summary Page Created:Fri August 11, 2006 16:20 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590307

Instrument: HRC Obs ID: 3695 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.511255 -10.846264 1093.573242 64.434433 16.971876 278.416314 -10.871007 885.539307 59.257824 14.943837 278.446789 -10.864972 769.108032 69.131271 11.125327 278.486335 -10.852688 711.553589 72.434914 9.823351 278.466628 -10.858770 664.450012 71.064575 9.349947 278.408102 -10.844634 568.666687 64.335732 8.839049 278.506602 -10.822153 570.958313 65.443390 8.724462 278.405970 -10.837915 487.272736 58.865051 8.277794 278.369815 -10.314775 351.000000 44.246674 7.932800 278.404414 -10.827716 441.479462 57.080124 7.734382