Summary Page Created:Mon July 24, 2006 15:25 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590308

Instrument: ACIS Obs ID: 3696 Source: CAS A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

acisf03696N002 full img2.fits acisf03696N002 cntr img2.fits

Summary Page Created:Mon July 24, 2006 15:25 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590308

Instrument: ACIS Obs ID: 3696 Source: CAS A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-24T19:10:40 Date and time of file creation DATE-OBS 2003-03-17T01:01:34 Observation start date DATE-END 2003-03-17T01:57:43 Observation end date RA PNT 350.97468615275 Pointing RA DEC PNT 58.760811399315 Pointing Dec ROLL PNT 6.384555198166 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-24T19:24:09 Date and time of file creation DATE-OBS 2003-03-17T01:01:34 Observation start date DATE-END 2003-03-17T01:57:43 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT CAS A[I3,-120,-3.0,3.5,0] Source name TITLE AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3696 Observation id SEQ NUM 590308 Sequence number RA NOM 350.97468615275 Nominal RA DEC NOM 58.760811399315 Nominal Dec ROLL NOM 6.384555198166 Nominal Roll

Summary Page Created:Mon July 24, 2006 15:25 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590308

Instrument: ACIS Obs ID: 3696 Source: CAS A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.897958 58.834673 925.375000 61.538059 15.037442 350.881282 58.796473 405.534088 29.939524 13.545108 350.849360 58.840272 734.897705 58.902420 12.476529 350.821738 58.792935 410.750000 34.408611 11.937419 350.870320 58.828575 311.916656 30.192322 10.330993 350.833721 58.824786 423.386353 42.852772 9.880023 350.857381 58.833865 396.136353 41.080677 9.642887 350.830455 58.842143 599.317505 62.612885 9.571792 350.854024 58.840986 480.806824 51.134239 9.402835 350.888211 58.796558 330.704559 35.555027 9.301204