Summary Page Created:Mon July 24, 2006 16:17 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590309

Instrument: ACIS Obs ID: 3697 Source: CAS A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

acisf03697N002 full img2.fits acisf03697N002 cntr img2.fits

Summary Page Created:Mon July 24, 2006 16:17 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590309

Instrument: ACIS Obs ID: 3697 Source: CAS A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-24T19:34:07 Date and time of file creation DATE-OBS 2003-03-17T01:57:43 Observation start date DATE-END 2003-03-17T03:01:40 Observation end date RA PNT 350.92940317221 Pointing RA DEC PNT 58.817221705302 Pointing Dec ROLL PNT 6.4285344258504 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-24T20:16:06 Date and time of file creation DATE-OBS 2003-03-17T01:57:43 Observation start date DATE-END 2003-03-17T03:01:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT CAS A[S3,-120,-2.0,0,0] Source name TITLE AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3697 Observation id SEQ NUM 590309 Sequence number RA NOM 350.92940317221 Nominal RA DEC NOM 58.817221705302 Nominal Dec ROLL NOM 6.4285344258504 Nominal Roll

Summary Page Created:Mon July 24, 2006 16:17 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590309

Instrument: ACIS Obs ID: 3697 Source: CAS A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO4A OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.848495 58.840197 343.363647 34.640419 9.912226 350.853235 58.840613 293.931824 30.868050 9.522202 350.866426 58.811777 100.857140 13.064332 7.720038 350.881436 58.796424 197.571426 25.757402 7.670472 350.848434 58.805775 145.829544 19.867867 7.339970 350.799657 58.804014 250.714279 35.369190 7.088494 350.830964 58.843039 209.795456 30.526089 6.872661 350.837339 58.841371 199.113632 30.464855 6.535847 350.886172 58.796709 176.857147 27.755371 6.371997 350.870281 58.828499 121.857140 19.480944 6.255197