Summary Page Created:Fri November 23, 2007 16:49 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590313

Instrument: HRC Obs ID: 3701 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

hrcf03701N004 full img2.fits hrcf03701N004 cntr img2.fits

Summary Page Created:Fri November 23, 2007 16:49 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590313

Instrument: HRC Obs ID: 3701 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T21:18:45 Date and time of file creation DATE-OBS 2003-11-09T15:32:09 Observation start date DATE-END 2003-11-09T21:04:21 Observation end date RA PNT 278.38881707491 Pointing RA DEC PNT -10.572628291548 Pointing Dec ROLL PNT 283.15581338563 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T21:47:43 Date and time of file creation DATE-OBS 2003-11-09T15:32:09 Observation start date DATE-END 2003-11-09T21:04:21 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT G21.5-0.9 Source name TITLE AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3701 Observation id SEQ NUM 590313 Sequence number RA NOM 278.38881707491 Nominal RA DEC NOM -10.572628291548 Nominal Dec ROLL NOM 283.15581338563 Nominal Roll

Summary Page Created:Fri November 23, 2007 16:49 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590313

Instrument: HRC Obs ID: 3701 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389895 -10.568770 177.500000 28.170473 6.300923 278.081888 -10.670074 350.873749 57.716488 6.079264 278.367548 -10.401973 145.351730 24.522818 5.927203 278.081289 -10.579223 286.481262 48.945648 5.853048 278.689312 -10.552320 297.027679 50.872795 5.838635 278.061049 -10.615319 325.215942 55.807114 5.827500 278.275869 -10.271246 328.936890 56.980507 5.772797 278.138810 -10.706420 271.833344 49.111465 5.535028 278.333361 -10.245744 328.276581 60.743053 5.404348 278.352566 -10.257361 310.803986 57.639072 5.392245