Summary Page Created:Fri June 30, 2006 08:39 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590314

Instrument: HRC Obs ID: 3702 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

hrcf03702N002 full img2.fits hrcf03702N002 cntr img2.fits

Summary Page Created:Fri June 30, 2006 08:39 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590314

Instrument: HRC Obs ID: 3702 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 Processing system revision DATE 2006-06-30T11:01:39 Date and time of file creation DATE-OBS 2003-11-09T21:04:21 Observation start date DATE-END 2003-11-10T03:09:08 Observation end date RA PNT 278.39058583975 Pointing RA DEC PNT -10.5730935584 Pointing Dec ROLL PNT 283.38576111795 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 Processing system revision DATE 2006-06-30T12:36:09 Date and time of file creation DATE-OBS 2003-11-09T21:04:21 Observation start date DATE-END 2003-11-10T03:09:08 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT G21.5-0.9 Source name TITLE AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3702 Observation id SEQ NUM 590314 Sequence number RA NOM 278.39058583975 Nominal RA DEC NOM -10.5730935584 Nominal Dec ROLL NOM 283.38576111795 Nominal Roll

Summary Page Created:Fri June 30, 2006 08:39 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590314

Instrument: HRC Obs ID: 3702 Source: G21.5-0.9 PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.274405 -10.289746 1847.700928 97.524300 18.946056 278.318513 -10.277344 2219.164307 128.780334 17.232168 278.337996 -10.271436 1946.949951 118.243332 16.465622 278.368808 -10.265130 1091.843750 77.050743 14.170450 278.292698 -10.283804 1537.111572 119.203079 12.894898 278.400453 -10.821779 631.041687 60.933392 10.356254 278.439434 -10.813305 865.625000 86.684380 9.985939 278.278598 -10.309149 989.958313 101.581383 9.745470 278.461604 -10.808839 782.125000 81.708168 9.572177 278.408210 -10.818312 758.875000 80.682465 9.405700