Summary Page Created:Thu June 29, 2006 06:10 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590315

Instrument: ACIS Obs ID: 3703 Source: CAS A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

acisf03703N002 full img2.fits acisf03703N002 cntr img2.fits

Summary Page Created:Thu June 29, 2006 06:10 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590315

Instrument: ACIS Obs ID: 3703 Source: CAS A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-29T09:57:57 Date and time of file creation DATE-OBS 2003-10-19T08:47:39 Observation start date DATE-END 2003-10-19T09:41:23 Observation end date RA PNT 350.70178808395 Pointing RA DEC PNT 58.82480416218 Pointing Dec ROLL PNT 221.03185567971 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-29T10:09:15 Date and time of file creation DATE-OBS 2003-10-19T08:47:39 Observation start date DATE-END 2003-10-19T09:41:23 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT CAS A[I3,-120,-3.0,3.5,0] Source name TITLE AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3703 Observation id SEQ NUM 590315 Sequence number RA NOM 350.70178808395 Nominal RA DEC NOM 58.82480416218 Nominal Dec ROLL NOM 221.03185567971 Nominal Roll

Summary Page Created:Thu June 29, 2006 06:10 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590315

Instrument: ACIS Obs ID: 3703 Source: CAS A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.887115 58.796671 985.897705 51.076832 19.302248 350.898143 58.834604 1042.875000 56.896358 18.329380 350.927689 58.816869 910.006897 62.910072 14.465202 350.880991 58.796181 501.000000 37.118935 13.497155 350.848751 58.840106 574.285706 47.818260 12.009757 350.899008 58.792343 548.642517 51.052387 10.746657 350.923352 58.812474 620.386230 61.427666 10.099460 350.870594 58.828793 288.875000 28.912928 9.991205 350.893501 58.794049 554.784973 56.076935 9.893284 350.891946 58.794312 445.284088 47.635399 9.347756