Summary Page Created:Fri November 23, 2007 15:35 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590317

Instrument: HRC Obs ID: 3705 Source: CAS A PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

hrcf03705N003 full img2.fits hrcf03705N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 15:35 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590317

Instrument: HRC Obs ID: 3705 Source: CAS A PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T20:21:08 Date and time of file creation DATE-OBS 2003-10-19T10:45:11 Observation start date DATE-END 2003-10-19T12:35:35 Observation end date RA PNT 350.84983388727 Pointing RA DEC PNT 58.813560807856 Pointing Dec ROLL PNT 220.67035200264 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T20:34:23 Date and time of file creation DATE-OBS 2003-10-19T10:45:11 Observation start date DATE-END 2003-10-19T12:35:35 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT CAS A Source name TITLE AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 3705 Observation id SEQ NUM 590317 Sequence number RA NOM 350.84983388727 Nominal RA DEC NOM 58.813560807856 Nominal Dec ROLL NOM 220.67035200264 Nominal Roll

Summary Page Created:Fri November 23, 2007 15:35 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590317

Instrument: HRC Obs ID: 3705 Source: CAS A PI: Dr. CXC Calibration Title: AO4B OBSERVATIONS OF THE STANDARD CANDLES CAS A AND G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.853229 58.840605 308.363647 28.947474 10.652523 350.848605 58.839972 331.272736 32.700951 10.130370 350.866462 58.811846 113.166664 13.872710 8.157502 350.881272 58.796410 184.784088 24.992624 7.393545 350.886307 58.796836 191.079544 27.057764 7.061912 350.888001 58.796654 198.181824 28.497963 6.954245 350.837504 58.841240 153.943176 24.411558 6.306159 350.891797 58.834881 128.727280 21.669008 5.940617 350.857600 58.834418 119.375000 20.316025 5.875904 350.922231 58.812107 179.000000 30.573647 5.854715