Summary Page Created:Sat August 12, 2006 03:24 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590319

Instrument: ACIS Obs ID: 4354 Source: G21.5-0.9[Chip S3, T=120, Offsets=-1,10,-17] PI: Dr. CXC Calibration Title: AO4 CALIBRATION OBSERVATIONS TO MEASURE THE MIRROR VIGNETTING

acisf04354N002 full img2.fits acisf04354N002 cntr img2.fits

Summary Page Created:Sat August 12, 2006 03:24 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590319

Instrument: ACIS Obs ID: 4354 Source: G21.5-0.9[Chip S3, T=120, Offsets=-1,10,-17] PI: Dr. CXC Calibration Title: AO4 CALIBRATION OBSERVATIONS TO MEASURE THE MIRROR VIGNETTING

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-12T06:57:28 Date and time of file creation DATE-OBS 2003-05-20T15:02:15 Observation start date DATE-END 2003-05-20T18:19:26 Observation end date RA PNT 278.54555421648 Pointing RA DEC PNT -10.495756253745 Pointing Dec ROLL PNT 108.52881614274 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-12T07:22:57 Date and time of file creation DATE-OBS 2003-05-20T15:02:15 Observation start date DATE-END 2003-05-20T18:19:26 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9[Chip S3, T=120, Offsets=-1,10,-17]

Source name

TITLE AO4 CALIBRATION OBSERVA- TIONS TO MEASURE THE MIR- ROR VIGNETTING

Prop

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 4354 Observation id SEQ NUM 590319 Sequence number RA NOM 278.54555421648 Nominal RA DEC NOM -10.495756253745 Nominal Dec ROLL NOM 108.52881614274 Nominal Roll

Summary Page Created:Sat August 12, 2006 03:24 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590319

Instrument: ACIS Obs ID: 4354 Source: G21.5-0.9[Chip S3, T=120, Offsets=-1,10,-17] PI: Dr. CXC Calibration Title: AO4 CALIBRATION OBSERVATIONS TO MEASURE THE MIRROR VIGNETTING

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.390000 -10.567996 5387.310547 124.821838 43.160000 278.367720 -10.400825 196.577682 18.853594 10.426537 278.387533 -10.547045 86.544998 19.487623 4.441024 278.370862 -10.659866 63.019608 15.849201 3.976201 278.505809 -10.463992 28.238636 7.164156 3.941656 278.770051 -10.559040 31.898272 8.547175 3.732025 278.363116 -10.588896 68.598213 19.259037 3.561872 278.728542 -10.289180 33.416668 9.441327 3.539403 278.542648 -10.355345 23.159090 6.548740 3.536419 278.367387 -10.591090 64.847321 19.634308 3.302756