Summary Page Created:Sat August 12, 2006 03:27 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590320

Instrument: ACIS Obs ID: 4355 Source: G21.5-0.9[Chip S3, T=120, Offsets=-1,15,-2] PI: Dr. CXC Calibration Title: AO4 CALIBRATION OBSERVATIONS TO MEASURE THE MIRROR VIGNETTING

acisf04355N002 full img2.fits acisf04355N002 cntr img2.fits

Summary Page Created:Sat August 12, 2006 03:27 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590320

Instrument: ACIS Obs ID: 4355 Source: G21.5-0.9[Chip S3, T=120, Offsets=-1,15,-2] PI: Dr. CXC Calibration Title: AO4 CALIBRATION OBSERVATIONS TO MEASURE THE MIRROR VIGNETTING

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-12T07:10:51 Date and time of file creation DATE-OBS 2003-05-20T18:19:26 Observation start date DATE-END 2003-05-20T21:24:26 Observation end date RA PNT 278.62587272427 Pointing RA DEC PNT -10.469258746034 Pointing Dec ROLL PNT 108.61512509031 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-12T07:26:18 Date and time of file creation DATE-OBS 2003-05-20T18:19:26 Observation start date DATE-END 2003-05-20T21:24:26 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-0.9[Chip S3, T=120, Offsets=-1,15,-2]

Source name

TITLE AO4 CALIBRATION OBSERVA- TIONS TO MEASURE THE MIR- ROR VIGNETTING

Prop

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 4355 Observation id SEQ NUM 590320 Sequence number RA NOM 278.62587272427 Nominal RA DEC NOM -10.469258746034 Nominal Dec ROLL NOM 108.61512509031 Nominal Roll

Summary Page Created:Sat August 12, 2006 03:27 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590320

Instrument: ACIS Obs ID: 4355 Source: G21.5-0.9[Chip S3, T=120, Offsets=-1,15,-2] PI: Dr. CXC Calibration Title: AO4 CALIBRATION OBSERVATIONS TO MEASURE THE MIRROR VIGNETTING

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.390249 -10.569196 9830.689453 137.886383 71.295578 278.368863 -10.401565 210.909088 21.577723 9.774391 278.369721 -10.403341 157.744827 20.692150 7.623414 278.363852 -10.630160 115.006248 24.466553 4.700550 278.345657 -10.576676 113.334824 26.350016 4.301129 278.505632 -10.464565 27.006897 6.767229 3.990835 278.379261 -10.658337 98.794022 24.809856 3.982047 278.338722 -10.541803 88.452675 23.016312 3.843043 278.543104 -10.355725 26.238636 6.997458 3.749738 278.367789 -10.645881 89.787376 23.980398 3.744199