Summary Page Created:Fri November 23, 2007 17:23 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290323

Instrument: HRC Obs ID: 5050 Source: Vega PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05050N003 full img2.fits hrcf05050N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 17:23 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290323

Instrument: HRC Obs ID: 5050 Source: Vega PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T22:14:27 Date and time of file creation DATE-OBS 2004-02-05T01:26:10 Observation start date DATE-END 2004-02-05T02:22:51 Observation end date RA PNT 279.2402475946 Pointing RA DEC PNT 38.785192260598 Pointing Dec ROLL PNT 41.115919668899 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T22:22:54 Date and time of file creation DATE-OBS 2004-02-05T01:26:10 Observation start date DATE-END 2004-02-05T02:22:51 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT Vega Source name TITLE AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5050 Observation id SEQ NUM 290323 Sequence number RA NOM 279.2402475946 Nominal RA DEC NOM 38.785192260598 Nominal Dec ROLL NOM 41.115919668899 Nominal Roll

Summary Page Created:Fri November 23, 2007 17:23 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290323

Instrument: HRC Obs ID: 5050 Source: Vega PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.246036 38.702442 23.000000 6.186684 3.717662 279.009796 38.541619 52.716072 14.537148 3.626301 279.571795 38.981706 51.033222 15.522537 3.287686 279.043073 38.535839 37.708332 11.676332 3.229467 279.534157 38.579312 45.965179 14.935266 3.077627