Summary Page Created:Sun June 4, 2006 07:18 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290324

Instrument: HRC Obs ID: 5051 Source: Vega PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05051N002 full img2.fits hrcf05051N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 07:18 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290324

Instrument: HRC Obs ID: 5051 Source: Vega PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T10:31:53 Date and time of file creation DATE-OBS 2004-02-05T02:22:51 Observation start date DATE-END 2004-02-05T03:04:40 Observation end date RA PNT 279.23937026076 Pointing RA DEC PNT 38.786994048816 Pointing Dec ROLL PNT 41.332818069578 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T11:16:46 Date and time of file creation DATE-OBS 2004-02-05T02:22:51 Observation start date DATE-END 2004-02-05T03:04:40 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Vega Source name TITLE AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5051 Observation id SEQ NUM 290324 Sequence number RA NOM 279.23937026076 Nominal RA DEC NOM 38.786994048816 Nominal Dec ROLL NOM 41.332818069578 Nominal Roll

Summary Page Created:Sun June 4, 2006 07:18 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290324

Instrument: HRC Obs ID: 5051 Source: Vega PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.234929 38.783919 117.375000 17.304516 6.782911 278.951488 38.581523 304.363403 50.480091 6.029375 278.935352 38.594088 272.090179 49.237335 5.526095 278.919059 38.606821 229.620529 42.132736 5.449932 278.983407 38.556185 222.810715 43.051254 5.175476 279.508668 38.914188 118.000000 28.494772 4.141110 279.027791 38.578592 129.135635 32.623142 3.958406 279.469587 38.952967 120.708336 33.935486 3.556995 279.125797 38.680651 50.799107 14.683743 3.459548 279.507637 38.910139 93.960785 27.268627 3.445747