Summary Page Created:Sun June 4, 2006 07:19 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290325

Instrument: HRC Obs ID: 5052 Source: Vega PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05052N002 full img2.fits hrcf05052N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 07:19 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290325

Instrument: HRC Obs ID: 5052 Source: Vega PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T10:34:42 Date and time of file creation DATE-OBS 2004-02-05T03:04:40 Observation start date DATE-END 2004-02-05T03:46:30 Observation end date RA PNT 279.40060656615 Pointing RA DEC PNT 38.896538982839 Pointing Dec ROLL PNT 41.187976589997 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T11:18:12 Date and time of file creation DATE-OBS 2004-02-05T03:04:40 Observation start date DATE-END 2004-02-05T03:46:30 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Vega Source name TITLE AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5052 Observation id SEQ NUM 290325 Sequence number RA NOM 279.40060656615 Nominal RA DEC NOM 38.896538982839 Nominal Dec ROLL NOM 41.187976589997 Nominal Roll

Summary Page Created:Sun June 4, 2006 07:19 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290325

Instrument: HRC Obs ID: 5052 Source: Vega PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.235315 38.783510 209295.390625 477.230011 438.562897 279.111898 38.691031 230.070541 40.797977 5.639263 279.096506 38.703512 217.797318 39.501537 5.513642 279.070917 38.728403 145.991959 30.369072 4.807258 279.144815 38.665988 155.732147 33.630669 4.630659 279.597241 39.092751 59.500000 16.914001 3.517796 279.440175 38.999954 22.795000 6.744510 3.379786 279.353411 38.815101 23.397728 7.089137 3.300504 279.167915 38.680379 114.333336 34.903454 3.275702 279.675059 39.023035 66.291664 20.389683 3.251236