Summary Page Created:Sun June 4, 2006 02:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290329

Instrument: HRC Obs ID: 5056 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

hrcf05056N002 full img2.fits hrcf05056N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 02:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290329

Instrument: HRC Obs ID: 5056 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T06:18:53 Date and time of file creation DATE-OBS 2004-02-02T10:37:37 Observation start date DATE-END 2004-02-02T11:21:06 Observation end date RA PNT 88.794152921802 Pointing RA DEC PNT 7.4028236269338 Pointing Dec ROLL PNT 286.46750117611 Pointing Roll RA TARG 88.792917 Observer’s specified target RA DEC TARG 7.407056 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T06:57:30 Date and time of file creation DATE-OBS 2004-02-02T10:37:37 Observation start date DATE-END 2004-02-02T11:21:06 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Betelgeuse Source name TITLE AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5056 Observation id SEQ NUM 290329 Sequence number RA NOM 88.794152921802 Nominal RA DEC NOM 7.4028236269338 Nominal Dec ROLL NOM 286.46750117611 Nominal Roll

Summary Page Created:Sun June 4, 2006 02:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290329

Instrument: HRC Obs ID: 5056 Source: Betelgeuse PI: Dr. CXC Calibration Title: AO5 Measurements of the optical/UV Transmission of the HRC and ACIS Filters.

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 88.666030 7.684142 228.106247 30.718565 7.425681 88.722598 7.698672 265.305359 44.768299 5.926188 88.703023 7.692228 233.464279 46.105846 5.063659 88.735068 7.704754 190.658936 39.017246 4.886530 88.671252 7.660896 154.125000 36.385548 4.235885 88.825032 7.161389 113.791664 28.613705 3.976824 88.864380 7.167413 110.041664 29.242498 3.763073 88.834385 7.334126 35.458332 9.429135 3.760507 88.830459 7.309561 33.193180 9.137079 3.632800 88.790198 7.613269 88.176079 24.339434 3.622766