Summary Page Created:Fri November 23, 2007 21:39 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290344

Instrument: HRC Obs ID: 5071 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05071N003 full img2.fits hrcf05071N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 21:39 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290344

Instrument: HRC Obs ID: 5071 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T02:30:35 Date and time of file creation DATE-OBS 2004-11-25T17:09:41 Observation start date DATE-END 2004-11-25T17:33:11 Observation end date RA PNT 332.14673467073 Pointing RA DEC PNT 45.803021823998 Pointing Dec ROLL PNT 284.54242687283 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T02:38:24 Date and time of file creation DATE-OBS 2004-11-25T17:09:41 Observation start date DATE-END 2004-11-25T17:33:11 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5071 Observation id SEQ NUM 290344 Sequence number RA NOM 332.14673467073 Nominal RA DEC NOM 45.803021823998 Nominal Dec ROLL NOM 284.54242687283 Nominal Roll

Summary Page Created:Fri November 23, 2007 21:39 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290344

Instrument: HRC Obs ID: 5071 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169995 45.742410 3753.477539 67.081306 55.954151 332.328039 46.022886 31.055172 8.295195 3.743754 332.078358 45.561618 32.583332 8.822902 3.693040 331.869221 45.711101 28.083057 8.937504 3.142159 332.310811 45.521037 38.107143 12.162491 3.133169 332.412637 45.848795 20.875000 6.712407 3.109913 332.590992 45.906610 40.561462 13.399212 3.027153 332.285026 45.495122 40.485050 13.489743 3.001173