Summary Page Created:Fri November 23, 2007 21:38 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290345

Instrument: HRC Obs ID: 5072 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05072N003 full img2.fits hrcf05072N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 21:38 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290345

Instrument: HRC Obs ID: 5072 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T02:29:51 Date and time of file creation DATE-OBS 2004-11-25T17:33:11 Observation start date DATE-END 2004-11-25T17:56:40 Observation end date RA PNT 332.13384320656 Pointing RA DEC PNT 45.835107039505 Pointing Dec ROLL PNT 284.55727135231 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T02:37:21 Date and time of file creation DATE-OBS 2004-11-25T17:33:11 Observation start date DATE-END 2004-11-25T17:56:40 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5072 Observation id SEQ NUM 290345 Sequence number RA NOM 332.13384320656 Nominal RA DEC NOM 45.835107039505 Nominal Dec ROLL NOM 284.55727135231 Nominal Roll

Summary Page Created:Fri November 23, 2007 21:38 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290345

Instrument: HRC Obs ID: 5072 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169970 45.742311 3504.613525 66.268883 52.884754 332.190168 45.527487 45.775002 11.410077 4.011805 331.693900 45.815990 36.719643 10.752091 3.415116 332.439503 45.739944 31.627451 9.301148 3.400381 332.474924 45.846329 30.549019 8.986575 3.399406 332.120487 45.554986 35.083332 10.545189 3.326952 332.468109 45.991573 30.208334 9.907437 3.049056