Summary Page Created:Fri November 23, 2007 22:23 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290348

Instrument: HRC Obs ID: 5075 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05075N003 full img2.fits hrcf05075N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 22:23 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290348

Instrument: HRC Obs ID: 5075 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T03:14:18 Date and time of file creation DATE-OBS 2004-11-25T18:43:41 Observation start date DATE-END 2004-11-25T19:07:11 Observation end date RA PNT 332.19256822843 Pointing RA DEC PNT 45.673554573999 Pointing Dec ROLL PNT 284.60351940936 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T03:22:52 Date and time of file creation DATE-OBS 2004-11-25T18:43:41 Observation start date DATE-END 2004-11-25T19:07:11 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5075 Observation id SEQ NUM 290348 Sequence number RA NOM 332.19256822843 Nominal RA DEC NOM 45.673554573999 Nominal Dec ROLL NOM 284.60351940936 Nominal Roll

Summary Page Created:Fri November 23, 2007 22:23 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290348

Instrument: HRC Obs ID: 5075 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170068 45.742360 3725.000000 63.927376 58.269245 331.999114 45.943620 61.657143 17.109123 3.603758 332.611308 45.696069 55.750000 16.371187 3.405373 332.320273 45.383511 58.767857 17.261642 3.404535 332.226380 45.391892 54.500000 16.753166 3.253117 331.962476 45.580775 25.795454 8.013676 3.218929 332.182108 45.968682 46.882141 14.754688 3.177440 332.588326 45.801369 50.297321 15.910176 3.161330 332.474754 45.563067 37.604389 11.905510 3.158570 332.101768 45.830818 27.082758 8.600220 3.149077