Summary Page Created:Fri November 23, 2007 22:24 EST page: 1 of 3

Chandra X-ray Center Seq Num: 290349

Instrument: HRC Obs ID: 5076 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

hrcf05076N003 full img2.fits hrcf05076N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 22:24 EST page: 2 of 3

Chandra X-ray Center Seq Num: 290349

Instrument: HRC Obs ID: 5076 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T03:14:53 Date and time of file creation DATE-OBS 2004-11-25T19:07:11 Observation start date DATE-END 2004-11-25T19:30:41 Observation end date RA PNT 332.20637418986 Pointing RA DEC PNT 45.641636354865 Pointing Dec ROLL PNT 284.61711891928 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T03:22:54 Date and time of file creation DATE-OBS 2004-11-25T19:07:11 Observation start date DATE-END 2004-11-25T19:30:41 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5076 Observation id SEQ NUM 290349 Sequence number RA NOM 332.20637418986 Nominal RA DEC NOM 45.641636354865 Nominal Dec ROLL NOM 284.61711891928 Nominal Roll

Summary Page Created:Fri November 23, 2007 22:24 EST page: 3 of 3

Chandra X-ray Center Seq Num: 290349

Instrument: HRC Obs ID: 5076 Source: ArLac PI: Dr. CXC Calibration Title: AO5 Calibration Observations to Monitor the Spatial Variations in the HRC-I Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170004 45.742334 4300.447266 69.934486 61.492516 332.046470 45.950004 55.498341 16.220257 3.421545 332.422452 45.415692 37.373428 11.642824 3.209997 332.157558 45.524544 20.238636 6.465486 3.130258 332.325580 45.326083 52.657806 16.942530 3.108025 332.206174 45.851147 27.387501 8.821840 3.104511 332.426564 45.795936 29.777409 9.623960 3.094091 331.773733 45.627916 43.826786 14.495041 3.023571