Summary Page Created:Sun June 4, 2006 13:27 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290355

Instrument: HRC Obs ID: 5082 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05082N002 full img2.fits hrcf05082N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 13:27 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290355

Instrument: HRC Obs ID: 5082 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T16:45:18 Date and time of file creation DATE-OBS 2004-02-09T13:36:08 Observation start date DATE-END 2004-02-09T14:00:25 Observation end date RA PNT 332.13008311335 Pointing RA DEC PNT 45.748388881852 Pointing Dec ROLL PNT 349.47537214768 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T17:26:16 Date and time of file creation DATE-OBS 2004-02-09T13:36:08 Observation start date DATE-END 2004-02-09T14:00:25 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5082 Observation id SEQ NUM 290355 Sequence number RA NOM 332.13008311335 Nominal RA DEC NOM 45.748388881852 Nominal Dec ROLL NOM 349.47537214768 Nominal Roll

Summary Page Created:Sun June 4, 2006 13:27 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290355

Instrument: HRC Obs ID: 5082 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169790 45.742363 4650.250000 73.541939 63.232624 331.714344 45.850148 87.238396 19.077286 4.572893 331.688776 45.756654 69.826782 15.442343 4.521774 331.700157 45.818307 67.657143 17.297350 3.911417 331.779635 45.846822 58.398460 15.362596 3.801341 331.786628 45.845838 53.441380 14.871819 3.593466 331.690714 45.779950 61.878571 17.597500 3.516327 331.705479 45.755498 65.487503 18.954966 3.454900 331.761585 45.748495 47.393105 14.112112 3.358328 331.802433 45.843791 48.583332 14.600309 3.327555