Summary Page Created:Sun June 4, 2006 13:38 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290361

Instrument: HRC Obs ID: 5088 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05088N002 full img2.fits hrcf05088N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 13:38 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290361

Instrument: HRC Obs ID: 5088 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T17:06:05 Date and time of file creation DATE-OBS 2004-02-09T16:01:44 Observation start date DATE-END 2004-02-09T16:26:01 Observation end date RA PNT 332.21501313087 Pointing RA DEC PNT 45.702402945276 Pointing Dec ROLL PNT 349.48359515464 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T17:37:35 Date and time of file creation DATE-OBS 2004-02-09T16:01:44 Observation start date DATE-END 2004-02-09T16:26:01 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5088 Observation id SEQ NUM 290361 Sequence number RA NOM 332.21501313087 Nominal RA DEC NOM 45.702402945276 Nominal Dec ROLL NOM 349.48359515464 Nominal Roll

Summary Page Created:Sun June 4, 2006 13:38 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290361

Instrument: HRC Obs ID: 5088 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169724 45.742329 5375.166504 77.530380 69.329811 331.773956 45.714754 96.435715 17.704529 5.446952 331.781167 45.746994 92.210716 19.162210 4.812112 331.790207 45.778724 73.210716 18.623470 3.931099 331.791713 45.798371 65.546425 16.986816 3.858665 331.811906 45.704277 62.791668 16.532204 3.798142 331.821619 45.755106 55.511364 17.039829 3.257742 331.837356 45.702907 45.445015 14.964641 3.036826