Summary Page Created:Sun June 4, 2006 16:20 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290371

Instrument: HRC Obs ID: 5098 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05098N002 full img2.fits hrcf05098N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 16:20 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290371

Instrument: HRC Obs ID: 5098 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T19:40:02 Date and time of file creation DATE-OBS 2004-02-09T20:04:24 Observation start date DATE-END 2004-02-09T20:28:41 Observation end date RA PNT 332.42001594562 Pointing RA DEC PNT 45.744043890028 Pointing Dec ROLL PNT 349.43796057707 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 Processing system revision DATE 2006-06-04T20:19:20 Date and time of file creation DATE-OBS 2004-02-09T20:04:24 Observation start date DATE-END 2004-02-09T20:28:41 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5098 Observation id SEQ NUM 290371 Sequence number RA NOM 332.42001594562 Nominal RA DEC NOM 45.744043890028 Nominal Dec ROLL NOM 349.43796057707 Nominal Roll

Summary Page Created:Sun June 4, 2006 16:20 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290371

Instrument: HRC Obs ID: 5098 Source: ArLac PI: Dr. CXC Calibration Title: AO5A Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169707 45.742128 3828.055176 69.861359 54.795029 331.985827 45.788673 152.532150 26.014273 5.863402 331.994829 45.827291 97.784821 23.751234 4.117042 331.995788 45.839210 79.345535 20.930704 3.790868 332.767329 45.746983 49.549019 14.545597 3.406462 332.760684 45.714795 56.000000 17.178949 3.259804 331.988150 45.814123 69.480354 22.620148 3.071614 332.012409 45.845570 64.760712 21.292698 3.041452 332.701309 45.701548 43.854465 14.569234 3.010073 331.978853 45.763198 62.511608 20.796261 3.005906