Summary Page Created:Mon April 10, 2006 15:58 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290377

Instrument: HRC Obs ID: 5104 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05104N002 full img2.fits hrcf05104N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 15:58 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290377

Instrument: HRC Obs ID: 5104 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:25:21 Date and time of file creation DATE-OBS 2004-11-28T06:38:46 Observation start date DATE-END 2004-11-28T07:02:17 Observation end date RA PNT 332.12546327689 Pointing RA DEC PNT 45.728042617778 Pointing Dec ROLL PNT 286.90741166065 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:57:06 Date and time of file creation DATE-OBS 2004-11-28T06:38:46 Observation start date DATE-END 2004-11-28T07:02:17 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5104 Observation id SEQ NUM 290377 Sequence number RA NOM 332.12546327689 Nominal RA DEC NOM 45.728042617778 Nominal Dec ROLL NOM 286.90741166065 Nominal Roll

Summary Page Created:Mon April 10, 2006 15:58 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290377

Instrument: HRC Obs ID: 5104 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169825 45.742525 4528.602051 71.798843 63.073471 331.934660 46.004830 77.823212 17.962938 4.332432 332.068532 46.035273 73.878571 17.960878 4.113305 332.024247 46.029054 75.321426 18.904970 3.984213 332.162509 45.479498 51.208332 13.428823 3.813315 332.075231 46.024341 71.847321 19.824123 3.624237 332.189238 45.525159 40.079464 12.163257 3.295126 332.299820 45.517894 40.882355 12.895737 3.170222