Summary Page Created:Mon April 10, 2006 15:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290378

Instrument: HRC Obs ID: 5105 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05105N002 full img2.fits hrcf05105N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 15:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290378

Instrument: HRC Obs ID: 5105 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:28:11 Date and time of file creation DATE-OBS 2004-11-28T07:02:17 Observation start date DATE-END 2004-11-28T07:25:46 Observation end date RA PNT 332.18660835955 Pointing RA DEC PNT 45.706121200481 Pointing Dec ROLL PNT 286.88655088147 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:58:01 Date and time of file creation DATE-OBS 2004-11-28T07:02:17 Observation start date DATE-END 2004-11-28T07:25:46 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5105 Observation id SEQ NUM 290378 Sequence number RA NOM 332.18660835955 Nominal RA DEC NOM 45.706121200481 Nominal Dec ROLL NOM 286.88655088147 Nominal Roll

Summary Page Created:Mon April 10, 2006 15:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290378

Instrument: HRC Obs ID: 5105 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169916 45.742430 4814.714355 72.539963 66.373268 332.141652 45.992053 101.208336 18.634127 5.431343 332.010651 45.987458 100.681252 20.282804 4.963872 332.121810 46.013639 88.989288 18.631620 4.776250 332.094121 45.885324 34.958332 10.885959 3.211323 332.039383 45.886966 38.079464 12.071370 3.154527 332.010187 45.963550 62.291668 20.284517 3.070897