Summary Page Created:Mon April 10, 2006 15:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290379

Instrument: HRC Obs ID: 5106 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05106N002 full img2.fits hrcf05106N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 15:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290379

Instrument: HRC Obs ID: 5106 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:30:12 Date and time of file creation DATE-OBS 2004-11-28T07:25:46 Observation start date DATE-END 2004-11-28T07:49:16 Observation end date RA PNT 332.2192096285 Pointing RA DEC PNT 45.747817393537 Pointing Dec ROLL PNT 286.86955434932 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:57:48 Date and time of file creation DATE-OBS 2004-11-28T07:25:46 Observation start date DATE-END 2004-11-28T07:49:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5106 Observation id SEQ NUM 290379 Sequence number RA NOM 332.2192096285 Nominal RA DEC NOM 45.747817393537 Nominal Dec ROLL NOM 286.86955434932 Nominal Roll

Summary Page Created:Mon April 10, 2006 15:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290379

Instrument: HRC Obs ID: 5106 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169932 45.742316 4483.000000 71.540039 62.664211 332.161771 46.055886 99.878571 18.721292 5.335025 332.034677 46.010955 79.833336 20.010036 3.989664 332.033964 46.024695 77.013390 20.270580 3.799269 332.126449 46.049514 70.819641 19.744144 3.586868 332.108327 46.044325 71.124107 20.318800 3.500409 332.179952 46.022089 58.237762 17.073084 3.411086 332.387246 45.529466 47.500000 14.721249 3.226629 332.351280 45.520714 48.333332 15.068952 3.207478 332.194282 45.989210 42.392159 13.977015 3.032991