Summary Page Created:Mon April 10, 2006 16:13 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290381

Instrument: HRC Obs ID: 5108 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05108N002 full img2.fits hrcf05108N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 16:13 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290381

Instrument: HRC Obs ID: 5108 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:32:56 Date and time of file creation DATE-OBS 2004-11-28T08:12:47 Observation start date DATE-END 2004-11-28T08:36:16 Observation end date RA PNT 332.11127588837 Pointing RA DEC PNT 45.759815508621 Pointing Dec ROLL PNT 286.96803307995 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T20:11:47 Date and time of file creation DATE-OBS 2004-11-28T08:12:47 Observation start date DATE-END 2004-11-28T08:36:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5108 Observation id SEQ NUM 290381 Sequence number RA NOM 332.11127588837 Nominal RA DEC NOM 45.759815508621 Nominal Dec ROLL NOM 286.96803307995 Nominal Roll

Summary Page Created:Mon April 10, 2006 16:13 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290381

Instrument: HRC Obs ID: 5108 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169848 45.742536 4330.143066 73.788078 58.683502 331.926430 46.036545 81.124107 20.579729 3.941942 332.093810 45.928981 35.089657 9.250716 3.793183 331.952164 45.964401 53.627453 14.839283 3.613884 331.937187 46.002153 64.944054 18.231525 3.562185 332.163015 45.522139 58.960785 17.212267 3.425509 331.953413 46.047216 64.764282 19.473471 3.325770 332.126235 45.578083 31.147728 10.300523 3.023898