Summary Page Created:Mon April 10, 2006 16:07 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290382

Instrument: HRC Obs ID: 5109 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05109N002 full img2.fits hrcf05109N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 16:07 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290382

Instrument: HRC Obs ID: 5109 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:33:25 Date and time of file creation DATE-OBS 2004-11-28T08:36:16 Observation start date DATE-END 2004-11-28T08:59:47 Observation end date RA PNT 332.13839744374 Pointing RA DEC PNT 45.695882180205 Pointing Dec ROLL PNT 286.97913024914 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T20:05:38 Date and time of file creation DATE-OBS 2004-11-28T08:36:16 Observation start date DATE-END 2004-11-28T08:59:47 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5109 Observation id SEQ NUM 290382 Sequence number RA NOM 332.13839744374 Nominal RA DEC NOM 45.695882180205 Nominal Dec ROLL NOM 286.97913024914 Nominal Roll

Summary Page Created:Mon April 10, 2006 16:07 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290382

Instrument: HRC Obs ID: 5109 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169825 45.742495 4706.583496 71.392632 65.925339 332.007829 45.985433 94.258926 22.838524 4.127190 332.157479 45.524620 50.227585 12.197729 4.117782 332.080324 46.002883 61.684822 17.171003 3.592383 331.990479 45.983557 74.788391 21.589556 3.464101 331.972950 45.904684 50.588234 14.656003 3.451707 332.301299 45.481078 53.625000 16.514217 3.247202 332.232077 45.466091 52.529411 16.330210 3.216702 331.954140 45.959243 65.083336 20.637285 3.153677 332.036002 45.991944 68.148216 22.038528 3.092231