Summary Page Created:Mon April 10, 2006 16:43 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290383

Instrument: HRC Obs ID: 5110 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05110N002 full img2.fits hrcf05110N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 16:43 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290383

Instrument: HRC Obs ID: 5110 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:36:31 Date and time of file creation DATE-OBS 2004-11-28T08:59:47 Observation start date DATE-END 2004-11-28T09:23:16 Observation end date RA PNT 332.23070287429 Pointing RA DEC PNT 45.715454851346 Pointing Dec ROLL PNT 286.92737727461 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T20:41:27 Date and time of file creation DATE-OBS 2004-11-28T08:59:47 Observation start date DATE-END 2004-11-28T09:23:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5110 Observation id SEQ NUM 290383 Sequence number RA NOM 332.23070287429 Nominal RA DEC NOM 45.715454851346 Nominal Dec ROLL NOM 286.92737727461 Nominal Roll

Summary Page Created:Mon April 10, 2006 16:43 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290383

Instrument: HRC Obs ID: 5110 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169965 45.742315 4644.583496 70.568596 65.816574 332.045082 45.986440 111.369644 23.406944 4.757975 332.128320 46.012178 100.033928 24.183437 4.136464 332.173197 46.023566 75.155357 18.567905 4.047595 332.082599 46.003785 73.871429 21.709150 3.402778 332.373809 45.489416 44.166668 13.227310 3.339051