Summary Page Created:Mon April 10, 2006 16:43 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290385

Instrument: HRC Obs ID: 5112 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05112N002 full img2.fits hrcf05112N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 16:43 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290385

Instrument: HRC Obs ID: 5112 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:39:33 Date and time of file creation DATE-OBS 2004-11-28T09:46:46 Observation start date DATE-END 2004-11-28T10:10:16 Observation end date RA PNT 332.14568955697 Pointing RA DEC PNT 45.801961388609 Pointing Dec ROLL PNT 286.99294527216 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T20:42:04 Date and time of file creation DATE-OBS 2004-11-28T09:46:46 Observation start date DATE-END 2004-11-28T10:10:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5112 Observation id SEQ NUM 290385 Sequence number RA NOM 332.14568955697 Nominal RA DEC NOM 45.801961388609 Nominal Dec ROLL NOM 286.99294527216 Nominal Roll

Summary Page Created:Mon April 10, 2006 16:43 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290385

Instrument: HRC Obs ID: 5112 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169890 45.742339 3837.170410 67.686340 56.690468 331.961180 46.078794 149.078568 29.310122 5.086249 332.060607 46.103782 153.711609 31.346237 4.903670 332.033959 46.097344 172.503571 35.726341 4.828470 332.016450 46.095903 133.348221 31.741236 4.201103 332.190214 45.557380 79.625000 20.289186 3.924504 332.101072 46.082746 87.000000 22.551067 3.857911 332.308422 45.583113 67.750000 18.351086 3.691880 332.087828 46.104082 86.864288 25.138624 3.455411 331.969629 46.059623 107.708336 31.269657 3.444500