Summary Page Created:Mon April 10, 2006 16:47 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290387

Instrument: HRC Obs ID: 5114 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05114N002 full img2.fits hrcf05114N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 16:47 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290387

Instrument: HRC Obs ID: 5114 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:44:53 Date and time of file creation DATE-OBS 2004-11-28T10:33:46 Observation start date DATE-END 2004-11-28T10:57:17 Observation end date RA PNT 332.09733685067 Pointing RA DEC PNT 45.791662789338 Pointing Dec ROLL PNT 287.0561246159 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T20:45:24 Date and time of file creation DATE-OBS 2004-11-28T10:33:46 Observation start date DATE-END 2004-11-28T10:57:17 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5114 Observation id SEQ NUM 290387 Sequence number RA NOM 332.09733685067 Nominal RA DEC NOM 45.791662789338 Nominal Dec ROLL NOM 287.0561246159 Nominal Roll

Summary Page Created:Mon April 10, 2006 16:47 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290387

Instrument: HRC Obs ID: 5114 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169874 45.742451 2838.857178 59.550529 47.671402 332.169770 45.742464 2401.102539 59.034611 40.672794 331.985507 46.086873 288.485718 41.887684 6.887125 331.905589 46.068366 170.604462 30.328739 5.625175 332.012754 46.092936 167.368744 34.483788 4.853549 331.949552 46.080094 169.513397 40.418507 4.193955 331.913278 46.055812 139.125000 33.890667 4.105113 332.059173 46.059674 76.377930 19.622631 3.892339 332.228030 45.564537 96.375000 26.742081 3.603871 331.918226 46.034481 96.165031 28.094957 3.422858