Summary Page Created:Mon April 10, 2006 16:47 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290388

Instrument: HRC Obs ID: 5115 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05115N002 full img2.fits hrcf05115N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 16:47 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290388

Instrument: HRC Obs ID: 5115 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T19:45:32 Date and time of file creation DATE-OBS 2004-11-28T10:57:17 Observation start date DATE-END 2004-11-28T11:20:46 Observation end date RA PNT 332.15245031315 Pointing RA DEC PNT 45.663996026958 Pointing Dec ROLL PNT 287.0629348631 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T20:46:05 Date and time of file creation DATE-OBS 2004-11-28T10:57:17 Observation start date DATE-END 2004-11-28T11:20:46 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5115 Observation id SEQ NUM 290388 Sequence number RA NOM 332.15245031315 Nominal RA DEC NOM 45.663996026958 Nominal Dec ROLL NOM 287.0629348631 Nominal Roll

Summary Page Created:Mon April 10, 2006 16:47 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290388

Instrument: HRC Obs ID: 5115 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169850 45.742515 3282.083252 60.191841 54.527046 331.967934 45.934745 186.759827 34.136444 5.470981 332.050235 45.959425 182.551788 37.872608 4.820154 332.158788 45.524169 52.217857 13.123322 3.979012 332.160724 45.820076 65.029999 16.444332 3.954554 331.972541 45.911455 99.419579 27.649942 3.595652 332.208197 45.419048 84.166664 23.472704 3.585725 332.155338 45.832705 57.668964 17.248892 3.343343 332.076520 45.874755 85.883720 25.715101 3.339817 332.136132 45.874577 72.308968 21.854639 3.308633