Summary Page Created:Mon April 10, 2006 17:46 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290391

Instrument: HRC Obs ID: 5118 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05118N002 full img2.fits hrcf05118N002 cntr img2.fits

Summary Page Created:Mon April 10, 2006 17:46 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290391

Instrument: HRC Obs ID: 5118 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T21:09:30 Date and time of file creation DATE-OBS 2004-11-28T12:07:46 Observation start date DATE-END 2004-11-28T12:31:16 Observation end date RA PNT 332.24708606924 Pointing RA DEC PNT 45.684190360592 Pointing Dec ROLL PNT 287.03758883602 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-10T21:45:15 Date and time of file creation DATE-OBS 2004-11-28T12:07:46 Observation start date DATE-END 2004-11-28T12:31:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5118 Observation id SEQ NUM 290391 Sequence number RA NOM 332.24708606924 Nominal RA DEC NOM 45.684190360592 Nominal Dec ROLL NOM 287.03758883602 Nominal Roll

Summary Page Created:Mon April 10, 2006 17:46 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290391

Instrument: HRC Obs ID: 5118 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170025 45.742308 3406.291748 61.580406 55.314537 332.055917 45.960754 79.933929 18.255537 4.378613 332.189413 45.986523 73.625893 19.451582 3.785085 332.322763 45.450448 48.470589 14.360164 3.375351 332.384617 45.507548 38.996429 11.840324 3.293527 332.209598 45.952401 52.515762 16.692526 3.146065 332.212423 45.942280 52.634483 16.771118 3.138401 332.073867 45.926733 55.002796 17.747000 3.099273 332.079686 45.967012 63.677677 21.120195 3.015014